Title: Titan II Missile Complex Image Hotspots

Blast Lock Area

This area had steel blast doors to protect the combat crew from nuclear detonations.

Missile Silo

This structure housed the missile.

Launch Control Center

The combat crew monitored the missile site and could launch the missile from this area.

Escape Ladder

This ladder ran up through the fresh air intake shaft, providing an emergency exit for the combat crew.

Access Portal

The combat crew entered the underground missile complex here by walking down 55 steps.

Cableway

Two steel tunnels connect the control center and the missile silo together and carry communication cables between the structures.

Credits: Titan II Missile Complex; by Titan Missile Museum; source https://titanmissilemuseum.org/about/titan-ii-history/